

  Welcome to the JNOS home station of WB8TKL.AMPR.org - 44.102.1.16
                 Located in Ypsilanti, Michigan
   This station supports AX.25, TCP/IP over AX.25, and NetROM/BPQ.
  
   Connect to: WB8TKL-0 (Node) / -1 (BBS)  -or-  "WB8TKL" for NetROM


------

           Welcome to Hamgate.Washtenaw.AMPR.Org - 44.102.1.1
                     Located in Ypsilanti, Michigan
  WB8TKL-3/WB8TKL-4 AX.25, NetROM/BPQ, TCP/IP router, SMTP server and BBS
      


